051015202530356:34:00.0

56.0

52.0

33:48.0

52:00.0

30.0

53:00.0

-19:54:00.0

55:00.0

RA (J2000)

Dec (J2000)

OBSID 00574935000 / DATE-OBS 2013-10-18T13:02:16.1

UVOT Finding Chart