05101520253035404519:22:00.0

50.0

21:40.0

34:30.0

35:00.0

30.0

-64:36:00.0

37:00.0

38:00.0

RA (J2000)

Dec (J2000)

OBSID 00575707000 / DATE-OBS 2013-10-24T12:28:48.8

UVOT Finding Chart