0123456789101114.0

1:02:10.0

06.0

30.0

32:30:00.0

29:00.0

28:00.0

RA (J2000)

Dec (J2000)

OBSID 00575905000 / DATE-OBS 2013-10-26T06:44:29.5

UVOT Finding Chart