05101520253035404544.0

12:35:40.0

36.0

52:00.0

30.0

51:00.0

27:50:00.0

49:30.0

RA (J2000)

Dec (J2000)

OBSID 00576064000 / DATE-OBS 2013-10-28T05:58:18.5

UVOT Finding Chart