0123456789101110.0

4:44:00.0

-62:58:00.0

30.0

59:00.0

-63:00:00.0

RA (J2000)

Dec (J2000)

OBSID 00576738000 / DATE-OBS 2013-11-05T02:09:50.6

UVOT Finding Chart