051015202530354028.0

24.0

22:09:20.0

16.0

42:00.0

30.0

-31:43:00.0

44:00.0

RA (J2000)

Dec (J2000)

OBSID 00577968000 / DATE-OBS 2013-11-17T00:35:25.6

UVOT Finding Chart