02468101254.0

9:02:50.0

46.0

42.0

38.0

25:30.0

26:00.0

30.0

-40:27:00.0

28:00.0

RA (J2000)

Dec (J2000)

OBSID 00578175000 / DATE-OBS 2013-11-19T20:41:33.5

UVOT Finding Chart