0510152025303522:11:00.0

56.0

52.0

10:48.0

30.0

37:00.0

36:36:00.0

35:00.0

RA (J2000)

Dec (J2000)

OBSID 00579571000 / DATE-OBS 2013-11-27T10:26:16.2

UVOT Finding Chart