051015202530354018.0

14.0

22:56:10.0

38:30.0

39:00.0

30.0

-21:40:00.0

41:00.0

RA (J2000)

Dec (J2000)

OBSID 00579982000 / DATE-OBS 2013-12-02T15:26:37.8

UVOT Finding Chart