0246810121440.0

8:46:30.0

20.0

09:00.0

30.0

-60:10:00.0

11:00.0

12:00.0

RA (J2000)

Dec (J2000)

OBSID 00580267000 / DATE-OBS 2013-12-05T09:23:56.2

UVOT Finding Chart