012345630.0

25.0

11:53:20.0

15.0

58:00.0

30.0

47:57:00.0

56:00.0

55:00.0

RA (J2000)

Dec (J2000)

OBSID 00581129000 / DATE-OBS 2013-12-15T03:31:49.9

UVOT Finding Chart