01E-16

2E-16

3E-16

4E-16

5E-16

6E-16

7E-16

48.0

44.0

14:07:40.0

36.0

30.0

21:00.0

1:20:00.0

19:00.0

18:30.0

RA (J2000)

Dec (J2000)

OBSID 00582760000 / DATE-OBS 2014-01-02T21:22:27.3

UVOT Finding Chart