02468101214161820222:31:30.0

26.0

22.0

34:00.0

30.0

-1:35:00.0

36:00.0

37:00.0

RA (J2000)

Dec (J2000)

OBSID 00585128000 / DATE-OBS 2014-01-29T03:26:07.8

UVOT Finding Chart