0510152025303538.0

34.0

17:44:30.0

26.0

43:00.0

30.0

-28:44:00.0

45:00.0

46:00.0

RA (J2000)

Dec (J2000)

OBSID 00586480000 / DATE-OBS 2014-02-12T17:20:14.4

UVOT Finding Chart