051015202510.0

7:01:00.0

50.0

40.0

00:30.0

07:00.0

30.0

08:00.0

09:00.0

-73:10:00.0

RA (J2000)

Dec (J2000)

OBSID 00586569000 / DATE-OBS 2014-02-13T20:18:57.8

UVOT Finding Chart