0123456789101142.0

36.0

6:56:30.0

30.0

48:00.0

41:47:00.0

46:00.0

45:30.0

RA (J2000)

Dec (J2000)

OBSID 00586680000 / DATE-OBS 2014-02-15T04:12:59.8

UVOT Finding Chart