051015202540.0

35.0

3:56:30.0

25.0

20.0

52:30.0

53:00.0

30.0

-48:54:00.0

55:00.0

RA (J2000)

Dec (J2000)

OBSID 00590503000 / DATE-OBS 2014-03-06T00:37:48.4

UVOT Finding Chart