0.005

0.01

0.015

0.02

0.025

0.03

0.035

0.04

0.045

28.0

24.0

12:16:20.0

16.0

14:00.0

30.0

20:13:00.0

12:00.0

11:00.0

RA (J2000)

Dec (J2000)

OBSID 00592204000 / DATE-OBS 2014-03-18T00:14:09.8

UVOT Finding Chart