01234567838.0

34.0

12:42:30.0

30.0

36:00.0

11:35:00.0

34:00.0

33:30.0

RA (J2000)

Dec (J2000)

OBSID 00592558000 / DATE-OBS 2014-03-20T06:15:56.4

UVOT Finding Chart