0510152025303542.0

36.0

3:58:30.0

24.0

25:30.0

26:00.0

30.0

-44:27:00.0

28:00.0

RA (J2000)

Dec (J2000)

OBSID 00594286000 / DATE-OBS 2014-04-01T18:28:49.6

UVOT Finding Chart