0510152020.0

10.0

9:40:00.0

47:30.0

48:00.0

30.0

49:00.0

-65:50:00.0

RA (J2000)

Dec (J2000)

OBSID 00595608000 / DATE-OBS 2014-04-12T22:24:58.2

UVOT Finding Chart