051015202518.0

12.0

06.0

13:09:00.0

30.0

49:50:00.0

49:00.0

48:00.0

47:30.0

RA (J2000)

Dec (J2000)

OBSID 00596901000 / DATE-OBS 2014-04-23T09:21:12.0

UVOT Finding Chart