0102030405046.0

21:16:40.0

34.0

28.0

30.0

02:00.0

01:00.0

49:00:00.0

48:59:30.0

RA (J2000)

Dec (J2000)

OBSID 00597841000 / DATE-OBS 2014-05-02T08:44:59.6

UVOT Finding Chart