02468101220.0

10.0

18:27:00.0

36:30.0

37:00.0

30.0

-55:38:00.0

39:00.0

RA (J2000)

Dec (J2000)

OBSID 00598284000 / DATE-OBS 2014-05-06T21:13:09.6

UVOT Finding Chart