02468101214161830.0

3:06:20.0

10.0

37:00.0

30.0

38:00.0

39:00.0

-62:40:00.0

RA (J2000)

Dec (J2000)

OBSID 00598497000 / DATE-OBS 2014-05-09T02:24:26.4

UVOT Finding Chart