01234567891006.0

16:52:00.0

54.0

51:48.0

30.0

56:00.0

39:55:00.0

54:00.0

53:30.0

RA (J2000)

Dec (J2000)

OBSID 00599188000 / DATE-OBS 2014-05-16T20:45:41.2

UVOT Finding Chart