0102030405060708044.0

3:33:40.0

36.0

32.0

28.0

04:00.0

30.0

-36:05:00.0

06:00.0

07:00.0

RA (J2000)

Dec (J2000)

OBSID 00599860000 / DATE-OBS 2014-05-24T13:40:21.4

UVOT Finding Chart