01234567834.0

21:30:30.0

26.0

57:00.0

30.0

14:56:00.0

55:00.0

RA (J2000)

Dec (J2000)

OBSID 00601662000 / DATE-OBS 2014-06-14T06:43:14.5

UVOT Finding Chart