0510152042.0

38.0

34.0

12:15:30.0

30.0

29:00.0

6:28:00.0

27:00.0

26:30.0

RA (J2000)

Dec (J2000)

OBSID 00602668000 / DATE-OBS 2014-06-26T15:40:16.4

UVOT Finding Chart