51015202543.0

2:42:40.0

37.0

34.0

20:30.0

21:00.0

30.0

-0:22:00.0

23:00.0

RA (J2000)

Dec (J2000)

OBSID 00602803000 / DATE-OBS 2014-06-28T14:35:42.5

UVOT Finding Chart