0246810121416:36:00.0

56.0

52.0

35:48.0

54:00.0

30.0

41:53:00.0

52:00.0

51:30.0

RA (J2000)

Dec (J2000)

OBSID 00602884000 / DATE-OBS 2014-06-29T14:19:23.7

UVOT Finding Chart