024681012141619:35:00.0

56.0

52.0

34:48.0

56:00.0

30.0

55:00.0

21:54:00.0

53:00.0

52:30.0

RA (J2000)

Dec (J2000)

OBSID 00603488000 / DATE-OBS 2014-07-05T09:34:05.8

UVOT Finding Chart