0510152025303520.0

10.0

9:44:00.0

33:00.0

30.0

63:32:00.0

31:00.0

30:30.0

RA (J2000)

Dec (J2000)

OBSID 00603866000 / DATE-OBS 2014-07-09T16:36:32.2

UVOT Finding Chart