024681012141628.0

24.0

2:44:20.0

16.0

31:00.0

30.0

35:30:00.0

29:00.0

28:30.0

RA (J2000)

Dec (J2000)

OBSID 00603954000 / DATE-OBS 2014-07-10T10:22:07.3

UVOT Finding Chart