024681012141618202230.0

23:42:20.0

10.0

41:30.0

42:00.0

30.0

-62:43:00.0

44:00.0

RA (J2000)

Dec (J2000)

OBSID 00604111000 / DATE-OBS 2014-07-12T03:25:19.5

UVOT Finding Chart