0246810121416182018:44:30.0

20.0

39:00.0

30.0

59:38:00.0

37:00.0

36:00.0

RA (J2000)

Dec (J2000)

OBSID 00604232000 / DATE-OBS 2014-07-13T18:58:27.7

UVOT Finding Chart