051015202530354042.0

38.0

34.0

3:26:30.0

30.0

44:00.0

28:43:00.0

42:00.0

41:30.0

RA (J2000)

Dec (J2000)

OBSID 00604675000 / DATE-OBS 2014-07-15T21:28:46.9

UVOT Finding Chart