1400

1600

1800

2000

2200

2400

2600

20.0

18:09:00.0

40.0

08:00.0

18:00.0

20:00.0

22:00.0

24:00.0

26:00.0

28:00.0

-20:30:00.0

32:00.0

34:00.0

36:00.0

RA (J2000)

Dec (J2000)

OBSID 00607399000 / DATE-OBS 2014-07-29T02:46:41.9

UVOT Finding Chart