051015202508.0

04.0

10:03:00.0

00:30.0

-26:01:00.0

30.0

02:00.0

RA (J2000)

Dec (J2000)

OBSID 00607506000 / DATE-OBS 2014-07-29T19:57:19.8

UVOT Finding Chart