0102030405044.0

17:12:40.0

36.0

32.0

28.0

37:30.0

38:00.0

30.0

39:00.0

-37:40:00.0

RA (J2000)

Dec (J2000)

OBSID 00609879000 / DATE-OBS 2014-08-18T17:23:17.1

UVOT Finding Chart