01234567844.0

2:41:40.0

36.0

32.0

28.0

39:30.0

-39:40:00.0

30.0

41:00.0

42:00.0

RA (J2000)

Dec (J2000)

OBSID 00612804000 / DATE-OBS 2014-09-16T10:49:18.4

UVOT Finding Chart