02468101214161838.0

34.0

17:06:30.0

26.0

30.0

59:00.0

23:58:00.0

57:00.0

56:30.0

RA (J2000)

Dec (J2000)

OBSID 00612974000 / DATE-OBS 2014-09-17T13:50:33.0

UVOT Finding Chart