0510152025303540455042.0

38.0

34.0

17:06:30.0

24:00:00.0

30.0

59:00.0

58:00.0

23:57:00.0

56:30.0

RA (J2000)

Dec (J2000)

OBSID 00612974000 / DATE-OBS 2014-09-17T14:58:45.9

UVOT Finding Chart