024681012149:01:40.0

36.0

32.0

25:00.0

30.0

-40:26:00.0

27:00.0

RA (J2000)

Dec (J2000)

OBSID 00613516000 / DATE-OBS 2014-09-24T01:50:37.7

UVOT Finding Chart