05101520253032.0

28.0

24.0

0:25:20.0

18:00.0

30.0

24:17:00.0

16:00.0

15:00.0

RA (J2000)

Dec (J2000)

OBSID 00614094000 / DATE-OBS 2014-09-30T19:56:33.1

UVOT Finding Chart