012345634.0

19:24:30.0

26.0

22.0

18.0

30.0

05:00.0

36:04:00.0

03:00.0

02:30.0

RA (J2000)

Dec (J2000)

OBSID 00614415000 / DATE-OBS 2014-10-05T05:27:55.9

UVOT Finding Chart