02468101214161810.0

15:00:00.0

14:59:50.0

30.0

21:00.0

55:20:00.0

19:00.0

18:00.0

RA (J2000)

Dec (J2000)

OBSID 00615873000 / DATE-OBS 2014-10-20T07:50:23.5

UVOT Finding Chart