0510152025303540455050.0

40.0

16:07:30.0

20.0

06:30.0

07:00.0

30.0

-72:08:00.0

09:00.0

RA (J2000)

Dec (J2000)

OBSID 00616061000 / DATE-OBS 2014-10-22T01:30:11.3

UVOT Finding Chart