02468101224.0

2:56:20.0

16.0

57:00.0

30.0

26:56:00.0

55:00.0

54:30.0

RA (J2000)

Dec (J2000)

OBSID 00616502000 / DATE-OBS 2014-10-26T02:39:49.6

UVOT Finding Chart