012345652.0

46.0

23:47:40.0

34.0

30.0

23:00.0

41:22:00.0

21:00.0

20:30.0

RA (J2000)

Dec (J2000)

OBSID 00617149000 / DATE-OBS 2014-10-31T15:01:35.7

UVOT Finding Chart